STATUS OF ELETTRAA. WrulichTwo years have been passed now since the start of ELETTRA commissioning. Atpresent the storage ring is dedicated for more than 80% of its operations time tobeamline commissioning and scientific experiments.The work performed in order to increase the reliability and the performance ofELETTRA is presented, and a review is given on the operational experience of thelast year. An outlook summarizes the improvements on the accelerators envisagedfor the future, and possible new developments.